Figur e 4.4 - Type 2 design for M = 3, K = L = 4 and J = 5 (a) Scaling and wa velet functions (b) Corr esponding continuous-domain fr equency response (c) Corr esponding PR �lter r esponses

(a)

(b)

(c)